9 Urządzenia Hot Swapping

9.1 Co to jest Hot Swapping ?

Co to jest hot swapping ?

Hot swapping to cecha urządzenia, która umożliwia wymianę lub dodawanie do urządzenia modułów (komponentów) bez konieczności zamykania, zatrzymania lub restartowania systemu. Przykładem takiego urządzenia jest model przełącznika wielowarstwowego 3650-24PS .

9.2 Dodawanie modu ł ów zasilaj ą cych ( Ć wiczenie 1) W tym ćwiczeniu zajmiemy się dodawaniem modułów zasilających AC-POWER-SUPPLY .

Krok 1 . Wstaw przełącznik wielowarstwowy 3650-24PS do topologii logicznej.

Rysunek 9.1 Wygląd symbolu 3650-24PS (topologia logiczna) Krok 2 . Zapoznaj się z wnękami przeznaczonymi na moduły zasilające. Przełącznik wielowarstwowy 3650-24PS posiada dwie puste wnęki (sloty) dla zasilania.

Rys. 9.2 Wygląd urządzenia 3650-24PS (miejsca na moduły zasilające) Zasilanie przełącznika odbywa się poprzez jeden lub moduły AC-POWER-SUPPLY .

Rysunek 9.3 Moduł zasilający AC-POWER-SUPPLY

Krok 3 . Przejdź do zakładki [Physical] i za pomocą myszki przenieś moduł AC-POWER-SUPPLY do pierwszego pustego slotu.

Rysunek 9.4 Wygląd urządzenia 3650-24PS (jeden moduł zasilający) Krok 4 . Za pomocą odpowiednich poleceń IOS, sprawdź moc pobieraną przez urządzenie oraz poszczególne interfejsy.

Polecenia:

show environment power

show power inline

Rysunek 9.5 Wynik wykonania polecenia show environment power Rysunek 9.6 Wynik wykonania polecenia show power inline Krok 5 . Przejdź do zakładki [ Physical ] i za pomocą myszki przenieś moduł AC-POWER-

SUPPLY do drugiego pustego slotu.

Rysunek 9.7 Wygląd urządzenia 3650-24PS (dwa moduły zasilające) Krok 6 . Za pomocą odpowiednich poleceń IOS, sprawdź moc pobieraną przez urządzenie. Polecenia:

show environment power

show power inline

Rysunek 9.8 Wynik wykonania polecenia show environment power

Rysunek 9.9 Wynik wykonania polecenia show power inline

1.2 Dodawanie urz ą dze ń PoE ( Ć wiczenie 2) To ćwiczenie jest kontynuacją ćwiczenia poprzedniego. Będziemy badać rozkład mocy zasilającej na poszczególnych portach przełącznika, do którego zostaną podłączone telefony IP.

Krok 1 . Podłącz do przełącznika 5 telefonów IP typu 7960.

Rysunek 9.10 Topologia sieci

Krok 2 . Za pomocą odpowiednich poleceń IOS, sprawdź rozkład mocy pobieranej na interfejsach Gig1/0/1 - Gig1/0/5.

show power inline

Rysunek 9.11 Wynik wykonania polecenia show power inline

9.3 Lista plików pomocniczych

hot-swapping-cwiczenie1.pkt

hot-swapping-cwiczenie2.pkt